% This is standard template for an AI Memo cover page
%
%  REPLACE ALL THE << >> ENTRIES WITH APPROPRIATE CONTENTS
%  EG  <<MONTH>> BECOMES DECEMBER
%
% ALSO BE SURE TO ADD ANY NECESSARY ADDITIONAL SPONSORS AND ACCOUNT NUMBERS
% TO THE ACKNOWLEDGEMENTS.
% 
\documentstyle[12pt]{article}
\advance\textheight by 1in
\advance\topmargin by -0.5in
\advance\textwidth by 0.4in
\advance\oddsidemargin by -0.2in
\advance\evensidemargin by -0.2in
\begin{document}
\begin{titlepage}
\begin{center}
MASSACHUSETTS INSTITUTE OF TECHNOLOGY\\
ARTIFICIAL INTELLIGENCE LABORATORY
\end{center}
\vspace{.2in}
A.I. Memo No.\ <<MEMO-NUMBER>> \hfill <<MONTH>> \number\year \par
\vspace{.2in}
\begin{center}
{\Large\bf <<TITLE>> } \\
\bigskip
\bigskip
{\large\bf <<AUTHOR>> } \\
\end{center}
\vfill
\begin{abstract}
{\normalsize\noindent
<<ABSTRACT-TEXT>>
\par}
\end{abstract}
\vfill
\vfill
\begin{center} \footnotesize
Copyright \copyright\ Massachusetts Institute of Technology, \number\year
\end{center}
\vfill

{\footnotesize \noindent This report describes research done at the
Artificial Intelligence Laboratory of the Massachusetts Institute of
Technology.  Support for the laboratory's artificial intelligence
research is provided in part by the Advanced Research Projects Agency of
the Department of Defense under Office of Naval Research contract
N00014-85-K-0124.
\par}

\vfill
\end{titlepage}
\end{document}
