Plate 4: IACC, EDT, BR, and G values for initial, target, and optimized configurations of Kresge Auditorium using the combined objective for speech and symphonic music. Material variables include the seats, stage walls, and far wall. Geometry variables include the rotation of the stage ceiling reflectors and the translation of the rear stage wall.

(a) Initial simulation (d) Initial difference

(e) Final difference

(b) Target

(c) Final simulation