80 msec

120 msec

160 msec

Final level

Plate 3: Sound strength shown on interior surfaces of Oakridge Bible Chapel at four time steps for initial and optimized configurations. Material variables include the walls and ceiling.

decibels

Initial configuration Optimized configuration