Plate 1: EDT, BR, and G values for initial, target, and optimized configurations of Oakridge Bible Chapel. Material variables include the walls and ceiling.

(a) Initial simulation

(b) Target

(c) Final simulation

(d) Initial difference

(e) Final difference